Tx 0.001 0.002 0.003 0.004

) NN2 s, NN1 s, _Tx(n

0

2

4

6 Pb, NSD − ALICE, p = 5.02 TeV NN2 s = 8.16 TeV, NN1 s < 0 y 0.5 < −

Fit with a constant function sys. ± (value) n particles, 0.10 ± , 4.94 0 K* 0.07 ± , 5.12 ϕ

ALI-PUB-544083

ALI-PUB-544083